Center at RA 08 54 48.87485908 DEC 20 06 30.6408600

OJ287 IPOL 43216.959 MHZ OJ287SEP07.IMAP.1

Plot file version 1 created 12-FEB-2008 20:06:09

Peak contour flux = 1.4243E+00 JY/BEAM Levs = 1.424E-02 * (0.500, 1, 2, 4, 8, 16, 32, 64)

MilliARC SEC

MilliARC SEC

2 1 0 -1 -2

2.5

2.0

1.5

1.0

0.5

0.0

-0.5

-1.0

-1.5

-2.0

-2.5

Pol line 1 milli arcsec = 1.6667E-01 JY/BEAM