Center at RA 22 02 43.29137400 DEC 42 16 39.9784498

BLLAC IPOL 43216.959 MHZ BLLACSEP07.IMAP.1

Plot file version 1 created 11-FEB-2008 14:39:38

Peak contour flux = 1.9742E+00 JY/BEAM Levs = 1.974E-02 * (0.350, 0.700, 1.400, 2.800, 5.600, 11.20, 22.40, 44.80, 89.60)

MilliARC SEC

MilliARC SEC

2 1 0 -1 -2

2.5

2.0

1.5

1.0

0.5

0.0

-0.5

-1.0

-1.5

-2.0

-2.5

Pol line 1 milli arcsec = 2.5000E-01 JY/BEAM