Center at RA 12 56 11.16649195 DEC -05 47 21.525719

3C279 IPOL 43216.959 MHZ 3C279SEP07.IMAP.1

Plot file version 1 created 12-FEB-2008 18:47:18

Peak contour flux = 1.1450E+01 JY/BEAM Levs = 1.145E-01 * (0.125, 0.250, 0.500, 1, 2, 4, 8, 16, 32, 64)

MilliARC SEC

MilliARC SEC

2 1 0 -1 -2

2.5

2.0

1.5

1.0

0.5

0.0

-0.5

-1.0

-1.5

-2.0

-2.5

Pol line 1 milli arcsec = 5.0000E-01 JY/BEAM